-- Reverse of mig 116 — t-paliad-225 / m/paliad#61 Slice C.

ALTER TABLE paliad.checklist_instances
    DROP COLUMN IF EXISTS template_version;

ALTER TABLE paliad.checklists
    DROP COLUMN IF EXISTS version;
