-- t-paliad-238: revert submission_drafts table.
--
-- The shared paliad.tg_set_updated_at trigger function is intentionally
-- left in place — it may be in use by other tables. DROP TABLE cascades
-- to the trigger that references it on this table only.

DROP TABLE IF EXISTS paliad.submission_drafts;
